SHEBA, Flight #rf07

05/24/1998, 22:34:41-23:04:41

C

UTC 22:34:41 22:40:41 22:46:41 22:52:41 22:58:41 23:04:41

-8.00

-7.44

-6.88

-6.31

-5.75

-5.19

-4.62

-4.06

-3.50

RSTB, 1 s/sec -6.46 0.50 0.25 -7.68 -3.74 C

RSTB1, 1 s/sec -6.48 0.43 0.18 -7.43 -3.88 C mean sigma var min max