14:23:22 2.64

14:29:20 0.80

14:35:21 0.80

14:41:20 0.79

14:47:20 1.11

14:53:22 1.12

14:59:21 1.13

15:5:22 1.15

15:11:21 1.14

15:17:20 1.15

15:23:21 1.14

15:29:22 1.15

15:35:20 1.14

15:41:21 1.15

15:47:22 1.15

15:53:20 1.15

15:59:20 1.14

1/21/98 14:23:22 - 16:2:57

Lake-ICE RF12 B