14:41:20 0.86

14:47:17 0.86

14:53:17 0.32

14:59:18 0.30

15:5:18 0.31

15:11:19 0.31

15:17:19 0.32

15:23:19 0.34

15:29:14 0.32

15:35:15 0.30

15:41:15 0.31

15:47:15 0.30

15:53:15 0.30

15:59:16 0.44

1/19/98 14:41:20 - 15:59:42

Lake-ICE RF10 B