14:8:18 0.68

14:14:15 0.69

14:20:17 0.70

14:26:18 0.69

14:32:15 0.69

14:38:16 0.67

14:44:17 0.69

14:50:18 0.70

14:56:15 0.70

15:2:16 0.67

15:8:17 0.69

1/13/98 14:8:18 - 15:9:28

Lake-ICE RF08 B