12:36:23 0.48

12:42:21 3.00

12:48:20 2.98

12:54:20 2.97

13:0:21 2.99

13:6:22 2.98

13:12:18 2.98

13:18:21 2.98

13:24:18 2.98

13:30:22 2.96

13:36:20 2.98

13:42:23 0.97

13:48:22 0.83

13:54:19 0.80

14:0:21 0.68

14:6:23 0.67

1/13/98 12:36:23 - 14:8:14

Lake-ICE RF08 A