16:17:14 0.98

16:22:13 1.00

16:27:14 1.44

16:32:12 1.62

16:37:13 1.61

16:42:13 1.63

16:47:14 1.62

16:52:13 1.61

16:57:14 1.62

17:2:14 1.63

17:7:12 1.61

17:12:13 1.61

17:17:13 1.62

17:22:14 1.94

17:27:12 1.94

17:32:13 2.55

17:37:13 3.76

17:42:14 3.76

17:47:12 3.74

17:52:13 3.75

17:57:12 3.74

18:2:14 2.15

12/10/97 16:17:14 - 18:3:6

Lake-ICE RF03 B