20:17:44 0.36

20:22:40 0.36

20:27:39 0.36

20:32:43 0.37

20:37:42 0.37

20:42:41 1.83

20:47:40 2.23

20:52:30 2.19

20:57:41 2.20

21:2:42 1.60

21:7:40 1.60

21:12:42 1.43

21:17:42 1.44

21:22:44 1.40

21:27:38 0.99

21:32:44 1.00

21:37:43 0.97

21:42:42 0.97

21:47:40 2.00

21:52:42 3.14

21:57:39 3.41

22:2:39 3.42

22:7:39 2.36

22:12:40 0.99

22:17:38 1.00

12/ 6/97 20:17:44 - 22:18:43

Lake-ICE RF02 D