TABLE 1Summary of SF6 release periods

Test # Start Stop Duration Type NW Winds Duration 1 154:2106 155:0250 5:44 line 2300-0250 3:50 2 156:1754 157:0115 7:21 line 1754-2400 6:06 3 157:1327 157:1546 2:19 line 1327-1500 1:33 4 158:2048 158:2325 2:37 point 5 159:2021 160:0759 10:38 line 0000-0759 7:59 6 160:2350 161:0213 2:23 line 7 161:2001 161:2329 3:28 point 8 161:2342 162:1642 16:42 line 2342-0100 1:17 0330-1130 8:00 9 163:1551 163:1812 2:21 line 1551-1700 1:09 10 166:1610 166:1739 1:29 line 1610-1630 0:20 11 166:1925 166:2329 4:14 point 12 167:0050 167:0350 2:15 line 0050-0250 2:00 13 168:1623 169:1624 24:01 line 1623-1200 19:37 1345-1500 1:15 14 171:0753 171:1810 10:37 line 0753-1230 4:37 1500-1700 2:00 15 172:0731 171:1803 10:32 line 0731-1300 5:29 1400-1600 2:00 16 173:0155 173:1616 14:21 line 0155-1616 14:21 17 174:0132 174:1537 14:05 line 0430-1200 7:30 18 176:0507 176:1734 12:27 line 0507-1700 11:53 19 177:0647 177:2020 13:33 line 0647-1930 12:43 20 178:0313 178:1832 15:19 line 0313-0800 4:47 1500-1600 1:00 21 179:0232 179:1806 15:34 line 1200-1600 4:00 0232-0800 5:28 22 180:0344 180:1723 13:39 line 0930-1500 5:30 23 181:0343 181:1618 14:35 line 0400-0700 3:00 Totals 219:54 137:24