TABLE 1Crop height at Station 3

Date North East South West SW *

6/22/96 0.10 6/25/96 0.02 7/2/96 0.01 7/7/96 0.31 0.22 0.10 0.28 0.10 7/12/96 0.30 0.29 0.15 0.29 0.15 7/17/96 0.39 0.45 0.19 0.34 0.19 7/22/96 0.52 0.40 0.27 0.46 0.28 7/27/96 0.57 0.57 0.32 0.50 0.34 8/1/96 0.62 0.64 0.35 0.60 0.37 8/6/96 0.65 0.75 0.47 0.68 0.48 8/11/96 0.80 0.80 0.57 0.75 0.57 8/19/96 0.84 0.84 0.70 0.76 0.69 * The direction of the prevailing wind into which the sonic anemometer boom is aligned.