TABLE 1Location and elevation of the FLATLAND96 sites

Site Latitude Longitude GPS Differential m USGS Elevation m Bondville 40^o 02’ 57.79” 88^o 22’ 51.80” 0.0 212 Monticello 40^o 01’ 05.03” 88^o 19’ 43.48” - 0.8 210 Sadorus 39^o 58’ 56.05” 88^o 24’ 00.28” - 0.4 210 Station 1 40^o 02’ 51.89” 88^o 22’ 23.91” 2.0 212.8 Station 2 39^o 59’ 34.79” 88^o 22’ 58.47” 0.2 211.8 Station 3 39^o 59’ 08.56” 88^o 22’ 57.49” 0.5 212.3