TABLE 1Station 1 weather plots

wx960615.ps wx960619.ps wx960623.ps wx960627.ps wx960701.ps wx960705.ps wx960709.ps wx960713.ps wx960717.ps wx960721.ps wx960725.ps wx960729.ps wx960802.ps wx960806.ps wx960810.ps wx960814.ps wx960818.ps wx960822.ps