TABLE 1Sonic anemometer data periods

Start Stop Inter val woffset lean leanaz Station 1 A 00:00, 18 Jun 22:00, 27 Jun 09 day, 22 hr -0.038 1.605 57.7 B 22:00, 27 Jun 18:00, 09 Jul 11 day, 20 hr -0.039 1.48 50.4 C 18:00, 09 Jul 17:00, 19 Jul 09 day, 23 hr -0.031 1.178 69.3 D 17:00, 19 Jul 21:00, 02 Aug 14 day, 04 hr -0.030 1.041 67.9 E 21:00, 02 Aug 14:00, 23 Aug 20 day, 17 hr -0.033 0.515 110.2 Station 2 A 00:00, 18 Jun 14:00, 03 Jul 15 day, 14 hr -0.015 0.932 52.1 B 14:00, 03 Jul 21:00, 10 Jul 07 day, 07 hr -0.067 0.531 149.5 C 21:00, 10 Jul 16:00, 13 Jul 02 day, 19 hr -0.006 0.688 125.4 D 16:00, 13 Jul 14:00, 23 Aug 40 day, 22 hr -0.008 0.696 117.4 Station 3 A 00:00, 18 Jun 00:00, 20 Jul 32 day, 00 hr -0.038 1.413 -173.0 B 00:00, 20 Jul 16:00, 26 Jul 06 day, 16 hr -0.069 1.605 -164.0 C 16:00, 26 Jul 15:00, 04 Aug 08 day, 23 hr -0.057 1.683 -171.7 D 15:00, 04 Aug 12:00, 17 Aug 12 day, 21 hr -0.042 1.561 -161.0 E 12:00, 17 Aug 15:00, 19 Aug 02 day, 03 hr bad data period F 15:00, 19 Aug 14:00, 23 Aug 03 day, 23 hr -0.051 2.979 154.5