TABLE 1Sonic anemometer heights

Station Height, m Start Stop Station 1 3.20 18 Jun, 00:00 Jun 27, 22:00 4.50 Jun 27, 22:00 Jul 9, 18:00 5.70 Jul 9, 18:00 Aug 23, 14:00 Station 2 4.54 18 Jun, 00:00 Jul 3, 14:00 5.67 Jul 3, 14:00 Aug 23, 14:00 Station 3 3.21 18 Jun, 00:00 Jul 26, 16:00 4.00 Jul 26, 16:00 Aug 23, 14:00