TABLE 1Sonic anemometer boom azimuth

Station Angle Start Stop Station 1 221^o 23’ 00” Jun 18, 00:00 Jul 9, 18:00 224^o 51’ 12” Jul 9, 18:00 Aug 23, 14:00 Station 2 215^o 10’ 48” Jun 18, 00:00 Jul 3, 14:00 213^o 58’ 25” Jul 3, 14:00 Aug 23, 14:00 Station 3 230 11’ 50” Jun 18, 00:00 Aug 23, 14:00